From 5c1a90103528dd3a93d3d8a2186276e9ebd0d400 Mon Sep 17 00:00:00 2001
From: Aleksey Kladov <aleksey.kladov@gmail.com>
Date: Wed, 28 Apr 2021 13:06:46 +0300
Subject: internal: ensure that client and server-side configs are not mixed up

https://github.com/rust-lang/rust/issues/84647 would help big time here.
---
 docs/user/generated_config.adoc | 5 -----
 1 file changed, 5 deletions(-)

(limited to 'docs/user/generated_config.adoc')

diff --git a/docs/user/generated_config.adoc b/docs/user/generated_config.adoc
index db3c5f7bb..e28423e99 100644
--- a/docs/user/generated_config.adoc
+++ b/docs/user/generated_config.adoc
@@ -234,11 +234,6 @@ site.
 --
 Whether to show inlay type hints for variables.
 --
-[[rust-analyzer.inlayHints.smallerHints]]rust-analyzer.inlayHints.smallerHints (default: `true`)::
-+
---
-Whether inlay hints font size should be smaller than editor's font size.
---
 [[rust-analyzer.lens.debug]]rust-analyzer.lens.debug (default: `true`)::
 +
 --
-- 
cgit v1.2.3

