From 5350c15e27bfb85d2e7ae3eae0e624197f2b9a70 Mon Sep 17 00:00:00 2001
From: Jonas Schievink <jonas.schievink@ferrous-systems.com>
Date: Fri, 23 Oct 2020 19:31:11 +0200
Subject: Fix name of InactiveCode diagnostic

---
 docs/user/generated_diagnostic.adoc | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'docs/user/generated_diagnostic.adoc')

diff --git a/docs/user/generated_diagnostic.adoc b/docs/user/generated_diagnostic.adoc
index 0b3cbcdde..34c4f98a3 100644
--- a/docs/user/generated_diagnostic.adoc
+++ b/docs/user/generated_diagnostic.adoc
@@ -5,6 +5,12 @@
 This diagnostic is triggered if `break` keyword is used outside of a loop.
 
 
+=== inactive-code
+**Source:** https://github.com/rust-analyzer/rust-analyzer/blob/master/crates/hir_def/src/diagnostics.rs#L98[diagnostics.rs]
+
+This diagnostic is shown for code with inactive `#[cfg]` attributes.
+
+
 === incorrect-ident-case
 **Source:** https://github.com/rust-analyzer/rust-analyzer/blob/master/crates/hir_ty/src/diagnostics.rs#L319[diagnostics.rs]
 
@@ -81,12 +87,6 @@ This diagnostic is triggered if operation marked as `unsafe` is used outside of
 This diagnostic is triggered if created structure does not have field provided in record.
 
 
-=== unconfigured-code
-**Source:** https://github.com/rust-analyzer/rust-analyzer/blob/master/crates/hir_def/src/diagnostics.rs#L98[diagnostics.rs]
-
-This diagnostic is shown for code with inactive `#[cfg]` attributes.
-
-
 === unresolved-extern-crate
 **Source:** https://github.com/rust-analyzer/rust-analyzer/blob/master/crates/hir_def/src/diagnostics.rs#L43[diagnostics.rs]
 
-- 
cgit v1.2.3

