From 2469af301780763cfcba728f275021da1ad42544 Mon Sep 17 00:00:00 2001
From: Aleksey Kladov <aleksey.kladov@gmail.com>
Date: Mon, 22 Mar 2021 13:56:13 +0300
Subject: Apply suggestions from code review
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Co-authored-by: Laurențiu Nicola <lnicola@users.noreply.github.com>
---
 docs/user/manual.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index 44f388930..8656dd1da 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -527,8 +527,8 @@ Here is a **non-exhaustive** list of ways to make rust-analyzer execute arbitrar
 * rust-analyzer's syntax trees library uses a lot of `unsafe` and hasn't been properly audited for memory safety.
 
 rust-analyzer itself doesn't access the network.
-VS Code plugin doesn't access the network unless the nightly channel is selected in the settings.
-In that case, the plugin uses GitHub API to check for and download updates.
+The VS Code plugin doesn't access the network unless the nightly channel is selected in the settings.
+In that case, the plugin uses the GitHub API to check for and download updates.
 
 == Features
 
-- 
cgit v1.2.3

