From 5cca4c921486eeed943cfb8bcc08ce0fbf647daf Mon Sep 17 00:00:00 2001
From: Masaki Hara <ackie.h.gmai@gmail.com>
Date: Mon, 21 Sep 2020 23:07:54 +0900
Subject: VS Code + WSL: describe binary location

It looks like VS Code server chooses a different location for `globalStorage`.
---
 docs/user/manual.adoc | 1 +
 1 file changed, 1 insertion(+)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index d3e6b23ae..7d85b36cb 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -66,6 +66,7 @@ To disable this notification put the following to `settings.json`
 The server binary is stored in:
 
 * Linux: `~/.config/Code/User/globalStorage/matklad.rust-analyzer`
+* Linux (Remote, such as WSL): `~/.vscode-server/data/User/globalStorage/matklad.rust-analyzer`
 * macOS: `~/Library/Application\ Support/Code/User/globalStorage/matklad.rust-analyzer`
 * Windows: `%APPDATA%\Code\User\globalStorage\matklad.rust-analyzer`
 
-- 
cgit v1.2.3

