From 6faf47c8fe3ca842a844b512b941eecc6aa0f5ee Mon Sep 17 00:00:00 2001
From: Veetaha <veetaha2@gmail.com>
Date: Wed, 22 Jul 2020 16:46:19 +0300
Subject: Update manual.adoc

---
 docs/user/manual.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index 978b463d5..57251b851 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -110,8 +110,8 @@ Here are some useful self-diagnostic commands:
 * **Rust Analyzer: Show RA Version** shows the version of `rust-analyzer` binary
 * **Rust Analyzer: Status** prints some statistics about the server, like the few latest LSP requests
 * To enable server-side logging, run with `env RA_LOG=info` and see `Output > Rust Analyzer Language Server` in VS Code's panel.
-* To log all LSP requests, add `"rust-analyzer.trace.server": "verbose"` to the settings and look for `Server Trace` in the panel.
-* To enable client-side logging, add `"rust-analyzer.trace.extension": true` to the settings and open the `Console` tab of VS Code developer tools.
+* To log all LSP requests, add `"rust-analyzer.trace.server": "verbose"` to the settings and look for `Rust Analyzer Language Server Trace` in the panel.
+* To enable client-side logging, add `"rust-analyzer.trace.extension": true` to the settings and open `Output > Rust Analyzer Client` in the panel.
 
 === rust-analyzer Language Server Binary
 
-- 
cgit v1.2.3

