From 804ae284b90dd3cc775f4c48fe55617d921a75a1 Mon Sep 17 00:00:00 2001
From: Aleksey Kladov <aleksey.kladov@gmail.com>
Date: Mon, 14 Dec 2020 15:06:24 +0300
Subject: Link config source

---
 docs/user/manual.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index 42317b231..1ec6e81bb 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -289,6 +289,8 @@ GNOME Builder 3.37.1 and newer has native `rust-analyzer` support. If the LSP bi
 
 == Configuration
 
+**Source:** https://github.com/rust-analyzer/rust-analyzer/blob/master/crates/rust-analyzer/src/config.rs[config.rs]
+
 rust-analyzer is configured via LSP messages, which means that it's up to the editor to decide on the exact format and location of configuration files.
 Please consult your editor's documentation to learn how to configure LSP servers.
 
-- 
cgit v1.2.3

