From 8b2a44dc3f40926c3893eb029480384227b36de5 Mon Sep 17 00:00:00 2001
From: vsrs <vit@conrlab.com>
Date: Fri, 3 Jul 2020 16:03:01 +0300
Subject: remove ---

---
 docs/user/manual.adoc | 10 ++++------
 1 file changed, 4 insertions(+), 6 deletions(-)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index ede21ed9b..ee29be0bb 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -343,16 +343,14 @@ More about `when` clause contexts https://code.visualstudio.com/docs/getstarted/
 === Setting runnable environment variables
 You can use "rust-analyzer.runnableEnv" setting to define runnable environment-specific substitution variables.
 The simplest way for all runnables in a bunch:
-[source,jsonc]
----
+```jsonc
 "rust-analyzer.runnableEnv": {
     "RUN_SLOW_TESTS": "1"
 }
----
+```
 
 Or it is possible to specify vars more granularly:
-[source,jsonc]
----
+```jsonc
 "rust-analyzer.runnableEnv": [
     {
         // "mask": null, // null mask means that this rule will be applied for all runnables
@@ -368,6 +366,6 @@ Or it is possible to specify vars more granularly:
         }
     }
 ]
----
+```
 
 You can use any valid RegExp as a mask. Also note that a full runnable name is something like *run bin_or_example_name*, *test some::mod::test_name* or *test-mod some::mod*, so it is possible to distinguish binaries, single tests, and test modules with this masks: `"^run"`, `"^test "` (the trailing space matters!), and `"^test-mod"` respectively.
-- 
cgit v1.2.3

