From 9f8f7a805316b7d43a623b1cc6df0f15a374a4cb Mon Sep 17 00:00:00 2001
From: Christoph Schmatzler <christoph@schmatzler.name>
Date: Mon, 24 May 2021 16:38:33 +0200
Subject: docs: fix binary installation instructions

issue #8926 removed uncompressed release artifacts. This updates the documentation to update instructions accordingly.
---
 docs/user/manual.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index ad367511b..4822d7dae 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -146,7 +146,7 @@ On Linux to install the `rust-analyzer` binary into `~/.local/bin`, this command
 
 [source,bash]
 ----
-$ curl -L https://github.com/rust-analyzer/rust-analyzer/releases/latest/download/rust-analyzer-linux -o ~/.local/bin/rust-analyzer
+$ curl -L https://github.com/rust-analyzer/rust-analyzer/releases/latest/download/rust-analyzer-x86_64-unknown-linux-gnu.gz | gunzip -c - > ~/.local/bin/rust-analyzer
 $ chmod +x ~/.local/bin/rust-analyzer
 ----
 
-- 
cgit v1.2.3

