From af8063fe373cf06a345b0d4eee14ef1ef6873bc7 Mon Sep 17 00:00:00 2001
From: Aleksey Kladov <aleksey.kladov@gmail.com>
Date: Tue, 29 Sep 2020 22:05:18 +0200
Subject: Extend **Status** command to also show dep info for the file

This should help with troubleshooting wrong project configuration
---
 docs/user/manual.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index 7d85b36cb..c1a778852 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -113,8 +113,8 @@ Note that installing via `xtask install` does not work for VS Code Remote, inste
 
 Here are some useful self-diagnostic commands:
 
-* **Rust Analyzer: Show RA Version** shows the version of `rust-analyzer` binary
-* **Rust Analyzer: Status** prints some statistics about the server, like the few latest LSP requests
+* **Rust Analyzer: Show RA Version** shows the version of `rust-analyzer` binary.
+* **Rust Analyzer: Status** prints some statistics about the server, and dependency information for the current file.
 * To enable server-side logging, run with `env RA_LOG=info` and see `Output > Rust Analyzer Language Server` in VS Code's panel.
 * To log all LSP requests, add `"rust-analyzer.trace.server": "verbose"` to the settings and look for `Rust Analyzer Language Server Trace` in the panel.
 * To enable client-side logging, add `"rust-analyzer.trace.extension": true` to the settings and open `Output > Rust Analyzer Client` in the panel.
-- 
cgit v1.2.3

