From 78d43eb1e8d8f1c9b64352facf7afa0a11362e78 Mon Sep 17 00:00:00 2001
From: Christian Authmann <8371862+cauthmann@users.noreply.github.com>
Date: Sun, 13 Dec 2020 15:21:11 +0100
Subject: Docs: Explain manual installation in VS Code

---
 docs/user/manual.adoc | 17 +++++++++++++++++
 1 file changed, 17 insertions(+)

(limited to 'docs/user/manual.adoc')

diff --git a/docs/user/manual.adoc b/docs/user/manual.adoc
index 9d4f52a93..42317b231 100644
--- a/docs/user/manual.adoc
+++ b/docs/user/manual.adoc
@@ -95,6 +95,23 @@ If you don't want to be asked for `Download now` every day when the new nightly
 
 NOTE: Nightly extension should **only** be installed via the `Download now` action from VS Code.
 
+==== Manual installation
+
+Alternatively, procure both `rust-analyzer.vsix` and your platform's matching `rust-analyzer-{platform}`, for example from the
+https://github.com/rust-analyzer/rust-analyzer/releases[releases] page.
+
+Install the extension with the `Extensions: Install from VSIX` command within VS Code, or from the command line via:
+[source]
+----
+$ code --install-extension /path/to/rust-analyzer.vsix
+----
+
+Copy the `rust-analyzer-{platform}` binary anywhere, then add the path to your settings.json, for example:
+[source,json]
+----
+{ "rust-analyzer.serverPath": "~/.local/bin/rust-analyzer-linux" }
+----
+
 ==== Building From Source
 
 Alternatively, both the server and the Code plugin can be installed from source:
-- 
cgit v1.2.3

