From e0b63855b1874ccc71a49c933f73c62c95a92d54 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Lauren=C8=9Biu=20Nicola?= <lnicola@users.noreply.github.com>
Date: Wed, 6 May 2020 19:53:14 +0300
Subject: Fix Windows server path

CC @Coder-256.
---
 docs/user/readme.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/user/readme.adoc')

diff --git a/docs/user/readme.adoc b/docs/user/readme.adoc
index 69f5b13d6..301e9a49c 100644
--- a/docs/user/readme.adoc
+++ b/docs/user/readme.adoc
@@ -61,7 +61,7 @@ The server binary is stored in:
 
 * Linux: `~/.config/Code/User/globalStorage/matklad.rust-analyzer`
 * macOS: `~/Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer`
-* Windows: `%APPDATA%\Code\User\globalStorage`
+* Windows: `%APPDATA%\Code\User\globalStorage\matklad.rust-analyzer`
 
 Note that we only support the latest version of VS Code.
 
-- 
cgit v1.2.3

