From 1cf27b2e78f327e449af9644d6d6dc1d274835b9 Mon Sep 17 00:00:00 2001
From: Aleksey Kladov <aleksey.kladov@gmail.com>
Date: Sat, 28 Mar 2020 12:55:56 +0100
Subject: Update docs/user/readme.adoc
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Co-Authored-By: Laurențiu Nicola <lnicola@users.noreply.github.com>
---
 docs/user/readme.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/user/readme.adoc')

diff --git a/docs/user/readme.adoc b/docs/user/readme.adoc
index 27b293415..1e427a15e 100644
--- a/docs/user/readme.adoc
+++ b/docs/user/readme.adoc
@@ -57,7 +57,7 @@ To disable this notification put the following to `settings.json`
 ----
 ====
 
-The server binary is stored in `~/.config/Code/User/globalStorage/matklad.rust-analyzer` (linux) or in `~/.Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer (macOS)`.
+The server binary is stored in `~/.config/Code/User/globalStorage/matklad.rust-analyzer` (Linux) or in `~/.Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer (macOS)`.
 
 Note that we only support the latest version of VS Code.
 
-- 
cgit v1.2.3

