From bcc171737889038061ebf5714f71618f1a913bd3 Mon Sep 17 00:00:00 2001
From: Jacob Greenfield <jacob@jacobgreenfield.me>
Date: Mon, 4 May 2020 13:16:29 -0400
Subject: Update server binary paths

Fixed macOS path and converted to a list
---
 docs/user/readme.adoc | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'docs/user/readme.adoc')

diff --git a/docs/user/readme.adoc b/docs/user/readme.adoc
index b1af72ce6..29959ca72 100644
--- a/docs/user/readme.adoc
+++ b/docs/user/readme.adoc
@@ -57,7 +57,11 @@ To disable this notification put the following to `settings.json`
 ----
 ====
 
-The server binary is stored in `~/.config/Code/User/globalStorage/matklad.rust-analyzer` (Linux) or in `~/.Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer` (macOS) or in `%APPDATA%\Code\User\globalStorage` (Windows).
+The server binary is stored in:
+
+* Linux: `~/.config/Code/User/globalStorage/matklad.rust-analyzer`
+* macOS: `~/Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer`
+* Windows: `%APPDATA%\Code\User\globalStorage`
 
 Note that we only support the latest version of VS Code.
 
-- 
cgit v1.2.3

