From df68373c8e5d76fe17ec43f90c84f26e1ddfd317 Mon Sep 17 00:00:00 2001
From: Edwin Cheng <edwin0cheng@gmail.com>
Date: Sat, 28 Mar 2020 21:00:41 +0800
Subject: Update docs to mention on Windows

---
 docs/user/readme.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/user/readme.adoc')

diff --git a/docs/user/readme.adoc b/docs/user/readme.adoc
index 1e427a15e..911163eb7 100644
--- a/docs/user/readme.adoc
+++ b/docs/user/readme.adoc
@@ -57,7 +57,7 @@ To disable this notification put the following to `settings.json`
 ----
 ====
 
-The server binary is stored in `~/.config/Code/User/globalStorage/matklad.rust-analyzer` (Linux) or in `~/.Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer (macOS)`.
+The server binary is stored in `~/.config/Code/User/globalStorage/matklad.rust-analyzer` (Linux) or in `~/.Library/Application Support/Code/User/globalStorage/matklad.rust-analyzer` (macOS) or in `%APPDATA%\Code\User\globalStorage` (Windows).
 
 Note that we only support the latest version of VS Code.
 
-- 
cgit v1.2.3

