From dfb931a4f1c39df7225db17e44e90cd192cd3d90 Mon Sep 17 00:00:00 2001
From: Alexandre Franke <alexandre.franke@gmail.com>
Date: Wed, 20 May 2020 20:11:14 +0200
Subject: Fix GNOME spelling

GNOME is a trademark. :-)
---
 docs/user/readme.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/user/readme.adoc')

diff --git a/docs/user/readme.adoc b/docs/user/readme.adoc
index 03836e6e2..40ed54809 100644
--- a/docs/user/readme.adoc
+++ b/docs/user/readme.adoc
@@ -249,7 +249,7 @@ If it worked, you should see "rust-analyzer, Line X, Column Y" on the left side
 
 If you get an error saying `No such file or directory: 'rust-analyzer'`, see the <<rust-analyzer-language-server-binary,`rust-analyzer` binary>> section on installing the language server binary.
 
-=== Gnome Builder
+=== GNOME Builder
 
 Prerequisites: You have installed the <<rust-analyzer-language-server-binary,`rust-analyzer` binary>>.
 
-- 
cgit v1.2.3

